10 100 1000

Parsecs

20

19

18

17

16

15

14

13

.2

0

-.2

-.4

-.6

-.8

-1

-1.2

-1.4

-1.6

N0821

20 25 30 35 40

PA

0 .2 .4 .6

.01 .1 1 10 1.2 1.3 1.4 1.5 1.6

V-I

Semimajor Axis (arcsec)