1 10 100

Parsecs

20

19

18

17

16

15

14

.2

0

-.2

-.4

-.6

-.8

-1

-1.2

-1.4

-1.6

N2434

60 80 100 120 140 160

PA

0 .2 .4 .6

.01 .1 1 10 1.3 1.4 1.5 1.6 1.7

V-I

Semimajor Axis (arcsec)